2000 - 01 EC2000 Visits

- 24 -

ABET - Engineering Accreditation Commission

PROGRAM AUDIT FORM

(PROVIDE A COPY TO INSTITUTION AT EXIT MEETING)

Institution ___________________________________________________________________________________

Program Name ____________________________ Prog ram Evaluator ________________________________

Program Criteria Used for Evaluation ___________________________________________________________

Team Chair ______________________________ Visit Dates ________________________________________

Use ^C~ for concern, ^W~ for weakness, and ^D~ for deficiency in the appropriate line 1 .

Exit

Interview

14 - Day

Response

Due

Process

Final

IF THE PROGRAM HAS NO DEFICIENCIES OR WEAKNESSES,

CHECK THIS LINE AT EACH APPROPRIATE TIME

1. STUDENTS

2. PROGR AM EDUCATIONAL OBJECTIVES

3. PROGRAM OUTCOMES AND ASSESSMENT

4. PROFESSIONAL COMPONENT

5. FACULTY

6. FACILITIES

7. INSTITUTIONAL SUPPORT AND FINANCIAL RESOURCES

8. PROGRAM CRITERIA

1 Definition of terms :

Concern: A concern indicates that a criterion is currentlysatisfied; however, potential exists for this situation to change in the near future such that the criterion maynot be satisfied. Positive action is required to ensure fullcompliance with t he criteria.

Weakness : A weakness indicates that a criterion is currentlysatisfied but lacks strength ofcompliance that assures that the qualityofthe programwillnot be compromised prior the next generalreview. Remedialaction is required to stren gthen compliance with the criteria.

Deficiency : A deficiencyindicates that a criterion is not satisfied. Therefore, the program is not in compliance with the criteria and immediate action is required.

2000 - 01 EC2000 Visits

- 25 -

RECOMMENDED ACCREDITATION ACTION FORM

Institu tion____________________________Program_______________Year___________

Evaluator _____________________________________

____

NGR This action indicates that the program is in full compliance with the applicable criteria.

This action is taken onlyafter a g eneral reviewand has a typical duration of six years.

_____RE This action indicates that satisfactoryremedial action has been taken bythe institution with respect to weaknesses identified in the prior IR action. This action is taken only after an IR e valuation. This action extends accreditation to the next general reviewand, thus, has a typical duration of either two or four years.

_____VE This action indicates that satisfactoryremedial action has been taken bythe institution with respect to weakn esses identified in the prior IV action. This action is taken only after an IV evaluation. This action extends accreditation to the next general reviewand, thus, has a typical duration of either two or four years.

_____SE This action indicates that sat isfactoryremedial action has been taken bythe institution with respect to deficiencies identified in the prior SC action. This action is taken only after a SC evaluation. This action typicallyextends accreditation to the next general reviewand, thus, has a duration from one to five years.

_____IR This action needed indicates that compliance with applicable criteria should be strengthened to ensure that the qualityof the program will not be compromised prior to the next review. The nature of the wea knesses is such that an on - site visit will not be requires to evaluate the remedial actions taken bythe institution. A report focusing on the remedial actions taken bythe institution will be required. This action has a typical duration of two years.

_ ____IV This action indicates that compliance with applicable criteria should be strengthened to ensure that the qualityof the program will not be compromised prior to the next review.

The nature of the weaknesses is such that an on - site visit will be req uired to evaluate the remedial actions taken bythe institution. This action has a typical duration of two years.

_____SC This action indicates that a program has deficiencies such that the program is not in full compliance with the applicable criteria. An on - site visit will be required to evaluate the actions taken bythe institution to remove the deficiencies. This action has a typical duration of one year.

_____NA This action indicates that a program has deficiencies such that the program is in conti nued non - compliance with the applicable criteria. This action is usuallytaken only after a SC evaluation or the evaluation of a new, unaccredited program. Accreditation is generallynot extended as a result of this action.

Ifthis is a new program, ind icate the academic year in which accreditation is to begin (See Section

II.C.4. ofthe Accreditation Policyand Procedure Manual.) _________.